/*
 Navicat Premium Data Transfer

 Source Server         : seeseele服务器
 Source Server Type    : MySQL
 Source Server Version : 80021
 Source Host           : 175.178.124.133:3306
 Source Schema         : vrone

 Target Server Type    : MySQL
 Target Server Version : 80021
 File Encoding         : 65001

 Date: 02/12/2024 19:07:15
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for vr_model_data
-- ----------------------------
DROP TABLE IF EXISTS `vr_model_data`;
CREATE TABLE `vr_model_data`  (
  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_source_id` int NULL DEFAULT NULL COMMENT '数据源id',
  `storage_id` int NULL DEFAULT NULL COMMENT '储存id',
  `data` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_german2_ci NULL DEFAULT NULL COMMENT '数据',
  `cover` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_german2_ci NULL DEFAULT NULL COMMENT '封面',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `update_time` datetime NULL DEFAULT NULL COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_german2_ci COMMENT = '模型类型数据源数据' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of vr_model_data
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
