/*
 Navicat Premium Data Transfer

 Source Server         : seeseele服务器
 Source Server Type    : MySQL
 Source Server Version : 80021
 Source Host           : 175.178.124.133:3306
 Source Schema         : vrone

 Target Server Type    : MySQL
 Target Server Version : 80021
 File Encoding         : 65001

 Date: 02/12/2024 19:07:33
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for vr_template_log
-- ----------------------------
DROP TABLE IF EXISTS `vr_template_log`;
CREATE TABLE `vr_template_log`  (
  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
  `template_id` int NULL DEFAULT NULL COMMENT '模板id',
  `user_id` int NULL DEFAULT NULL COMMENT '用户id',
  `create_time` datetime NULL DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 9 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_german2_ci COMMENT = '模板购买记录表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of vr_template_log
-- ----------------------------
INSERT INTO `vr_template_log` VALUES (3, 11, 103, '2024-06-23 15:26:58');
INSERT INTO `vr_template_log` VALUES (4, 11, 100, '2024-06-23 15:27:22');
INSERT INTO `vr_template_log` VALUES (5, 13, 100, '2024-07-01 17:03:09');
INSERT INTO `vr_template_log` VALUES (6, 13, 103, '2024-07-01 17:03:22');
INSERT INTO `vr_template_log` VALUES (7, 12, 103, '2024-07-09 15:30:18');
INSERT INTO `vr_template_log` VALUES (8, 12, 100, '2024-07-09 15:30:20');

SET FOREIGN_KEY_CHECKS = 1;
